<template>
  <div class="handle-history">
     <HandlerHistoryTable columns-type="operatorhistory" device-type="pressurefan" :device-list-api="getTableList.bind(null, {devicekind :'pressurefan'})" designScope="pressurefan_history" />
  </div>
</template>
<script setup lang="ts">
  import HandlerHistoryTable from '../../comment/HandlerHistoryTable.vue';
  import { getTableList } from '../nitrogen.api'

</script>
<style lang="less" scoped>
  .handle-history{
    position: fixed;
    top: 80px;
  }
</style>