<template>
  <div class="history-box">
    <HistoryTable
      :columns-type="`${deviceType}`"
      :device-type="deviceType"
      :sysId="deviceId"
      designScope="pressurefan_history"
      :scroll="{ y: 650 }"
    />
  </div>
</template>
<script setup lang="ts">
  import { ref, defineProps } from 'vue';
  import HistoryTable from '../../comment/HistoryTable.vue';
  // import { getTableList } from '../balancePress.api'

  const props = defineProps({
    deviceType: {
      type: String,
      required: true,
    },
    deviceId: {
      type: String,
      required: true,
    },
  });
</script>
<style lang="less" scoped>
  .history-box {
    pointer-events: auto;
  }
</style>
