<template>
  <customHeader>预警监测管控系统</customHeader>
  <div class="sensor-container">
    <div class="lr left-box">
      <ventBox1>
        <template #title>
          <div class="monitor-title" @click="showModal('vent')">通风预警监测</div>
        </template>
        <template #container>
          <!-- <div ref="alarmCounts" style="height: 160px" id="alarmCounts"></div> -->
          <div class="vent-param">
            <div class="light-group">
              <div class="param-item">
                <div class="param">
                  <div class="param-icon">
                    <div class="param-title">总进风量</div>
                    <div class="param-unit">(m³/min)</div>
                  </div>

                  <div class="param-val-box">
                    <div class="param-val-icon"></div>
                    <div class="param-val">{{ windData.jf || 0 }}</div>
                  </div>
                </div>
              </div>
              <div class="param-item">
                <div class="param">
                  <div class="param-icon">
                    <div class="param-title">总回风量</div>
                    <div class="param-unit">(m³/min)</div>
                  </div>
                  <div class="param-val-box">
                    <div class="param-val-icon"></div>
                    <div class="param-val">{{ windData.hf || 0 }}</div>
                  </div>
                </div>
              </div>
              <div class="param-item">
                <div class="param">
                  <div class="param-icon">
                    <div class="param-title">总需风量</div>
                    <div class="param-unit">(m³/min)</div>
                  </div>
                  <div class="param-val-box">
                    <div class="param-val-icon"></div>
                    <div class="param-val">{{ windData.xf || 0 }}</div>
                  </div>
                </div>
              </div>
            </div>
          </div>
          <!-- <div ref="alarmCounts" style="height: 225px" id="alarmCounts"></div> -->
          <BarSingle :xAxisData="xAxisData" :dataSource="windData.levels" height="225px" :chartsColumns="chartsColumns"
            :option="option" :color="colors" :fontColor="fontColor" />
        </template>
      </ventBox1>
      <ventBox1 class="vent-margin-t-10">
        <template #title>
          <div class="monitor-title" @click="showModal('sbyj')">设备预警监测</div>
        </template>
        <template #container>
          <div class="icons-box" @mouseleave="resetScroll">
            <template v-for="(item, key) in iconsMonitor" :key="key">
              <div class="icon-item" v-if="[0, 101, 103, 104, 201].includes(item.level)">
                <div class="wrapper">
                  {{ item.text }}
                </div>
                <div></div>
                <img :src="item.url" :alt="item.text" />
                <div class="level-text" :class="{
                  'level-text-0': item.level == 0,
                  'level-text-1': item.level == 101,
                  'level-text-2': item.level == 102,
                  'level-text-3': item.level == 103,
                  'level-text-4': item.level == 104,
                  'level-text-5': item.level == 201,
                  'level-text-6':
                    item.level != 0 && item.level != 101 && item.level != 102 && item.level != 103 && item.level != 104 && item.level != 201,
                }">{{
                  item.level == 0
                    ? '低风险'
                    : item.level == 101
                      ? '低风险'
                      : item.level == 102
                        ? '一般风险'
                        : item.level == 103
                          ? '较大风险'
                          : item.level == 104
                            ? '较大风险'
                            : item.level == 201
                              ? '报警'
                              : '未连接'
                }}</div>
              </div>
            </template>
          </div>
        </template>
      </ventBox1>
    </div>
    <div class="center-box">
      <div class="animation-box">
        <canvas class="rain"></canvas>
        <div class="bottom" :class="{
          bottom1: centerData.levels == 101 || centerData.levels == 0 || centerData.levels == 10000,
          bottom2: centerData.levels == 102,
          bottom3: centerData.levels == 103,
          bottom4: centerData.levels == 104,
          bottom5: centerData.levels == 201,
        }">
          <div class="animation1">
            <div class="ball"></div>
            <svg xmlns="http://www.w3.org/2000/svg" width="375.334" height="77.559" viewBox="0 0 375.334 77.559"
              style="opacity: 0.5">
              <g id="组_14135" data-name="组 14135" transform="translate(-755.058 -139.886)">
                <path id="椭圆_2595" data-name="椭圆 2595"
                  d="M186.917-.75c12.711,0,25.415.263,37.757.783,12.03.506,23.863,1.262,35.171,2.245,11.1.966,21.816,2.161,31.835,3.553,9.928,1.379,19.265,2.963,27.751,4.709s16.2,3.668,22.92,5.713A120.653,120.653,0,0,1,359.7,22.825a40.842,40.842,0,0,1,11.018,7.3c2.568,2.581,3.87,5.239,3.87,7.9s-1.3,5.322-3.87,7.9a40.842,40.842,0,0,1-11.018,7.3,120.653,120.653,0,0,1-17.345,6.572c-6.716,2.044-14.428,3.966-22.92,5.713s-17.823,3.329-27.751,4.709c-10.02,1.392-20.731,2.588-31.835,3.553-11.308.984-23.142,1.739-35.171,2.245-12.343.519-25.046.783-37.757.783s-25.415-.263-37.757-.783c-12.03-.506-23.863-1.262-35.171-2.245-11.1-.966-21.816-2.161-31.835-3.553-9.928-1.379-19.265-2.963-27.751-4.709s-16.2-3.668-22.92-5.713a120.652,120.652,0,0,1-17.345-6.572,40.841,40.841,0,0,1-11.018-7.3c-2.568-2.581-3.87-5.239-3.87-7.9s1.3-5.322,3.87-7.9a40.842,40.842,0,0,1,11.018-7.3,120.651,120.651,0,0,1,17.345-6.572C38.2,14.208,45.91,12.286,54.4,10.54S72.225,7.211,82.153,5.831c10.02-1.392,20.731-2.588,31.835-3.553C125.3,1.294,137.13.539,149.16.033,161.5-.487,174.206-.75,186.917-.75Zm0,76.98c49.941,0,96.885-4,132.186-11.257,17.134-3.523,30.578-7.623,39.96-12.184,9.642-4.688,14.53-9.653,14.53-14.759s-4.889-10.072-14.53-14.759c-9.382-4.561-22.826-8.66-39.96-12.184C283.8,3.827,236.858-.171,186.917-.171s-96.885,4-132.186,11.257C37.6,14.61,24.153,18.709,14.771,23.27,5.129,27.958.241,32.923.241,38.029S5.129,48.1,14.771,52.789c9.382,4.561,22.826,8.661,39.96,12.184C90.032,72.232,136.976,76.23,186.917,76.23Z"
                  transform="translate(755.808 140.636)" fill="#28a6ff" opacity="0.7" />
              </g>
            </svg>
          </div>
          <div class="animation2">
            <div class="ball1"></div>
            <svg xmlns="http://www.w3.org/2000/svg" width="414.878" height="91.7" viewBox="0 0 414.878 91.7">
              <g id="组_14136" data-name="组 14136" transform="translate(-721.822 -158.273)">
                <path id="椭圆_2595" data-name="椭圆 2595"
                  d="M206.689-.75c14.05,0,28.092.311,41.735.925,13.3.6,26.377,1.492,38.877,2.655,12.275,1.142,24.114,2.555,35.189,4.2,10.974,1.631,21.294,3.5,30.674,5.567s17.91,4.337,25.335,6.754a128.134,128.134,0,0,1,19.172,7.771,45.082,45.082,0,0,1,12.178,8.633c2.838,3.051,4.278,6.195,4.278,9.344s-1.439,6.293-4.278,9.344a45.082,45.082,0,0,1-12.178,8.633A128.134,128.134,0,0,1,378.5,70.847c-7.424,2.417-15.948,4.69-25.335,6.754s-19.7,3.936-30.674,5.567c-11.075,1.646-22.915,3.059-35.189,4.2-12.5,1.163-25.58,2.056-38.877,2.655-13.643.614-27.685.925-41.735.925s-28.092-.311-41.735-.925c-13.3-.6-26.377-1.492-38.877-2.655-12.275-1.142-24.114-2.555-35.189-4.2-10.974-1.631-21.294-3.5-30.674-5.567S42.3,73.265,34.879,70.847a128.133,128.133,0,0,1-19.173-7.771A45.082,45.082,0,0,1,3.528,54.444C.689,51.393-.75,48.249-.75,45.1s1.439-6.293,4.278-9.344a45.083,45.083,0,0,1,12.178-8.633,128.133,128.133,0,0,1,19.173-7.771c7.424-2.417,15.948-4.69,25.335-6.754s19.7-3.936,30.674-5.567c11.075-1.646,22.915-3.059,35.189-4.2,12.5-1.163,25.58-2.056,38.877-2.655C178.6-.439,192.639-.75,206.689-.75Zm0,91.015c55.2,0,107.093-4.727,146.113-13.31,18.939-4.166,33.8-9.012,44.17-14.405,10.657-5.542,16.061-11.413,16.061-17.45s-5.4-11.908-16.061-17.45c-10.37-5.393-25.231-10.24-44.17-14.405C313.782,4.662,261.892-.065,206.689-.065S99.6,4.662,60.576,13.244c-18.939,4.166-33.8,9.012-44.17,14.405C5.749,33.192.345,39.063.345,45.1s5.4,11.908,16.061,17.45c10.37,5.393,25.231,10.24,44.17,14.405C99.6,85.538,151.487,90.265,206.689,90.265Z"
                  transform="translate(722.572 159.023)" fill="#3dd8ff" opacity="0.5" />
              </g>
            </svg>
          </div>
          <div class="text-box">
            <div class="text1">{{
              centerData.levels == 101
                ? '低风险'
                : centerData.levels == 102
                  ? '一般风险'
                  : centerData.levels == 103
                    ? '较大风险'
                    : centerData.levels == 104
                      ? '重大风险'
                      : centerData.levels == 201
                        ? '报警'
                        : // : centerData.levels == 0
                        // ? '正常'
                        // : centerData.levels == 10000
                        // ? '正常'
                        '低风险'
            }}</div>
            <div class="text2">风险分析</div>
          </div>
          <div class="icon-animation"></div>
        </div>

        <div class="total-item-monitor-box">
          <div class="item item1">
            <div class="icon-box">
              <div class="icon"></div>
            </div>
            <div class="item-monitor-box">
              <span class="title">火灾预警监测</span>
              <span :class="centerData.fire ? 'value' : 'value1'">{{ centerData.fire == '正常' ? '低风险' : centerData.fire
                }}</span>
            </div>
          </div>
          <div class="item item2">
            <div class="icon-box">
              <div class="icon"></div>
            </div>
            <div class="item-monitor-box">
              <span class="title">设备预警监测</span>
              <span :class="centerData.sb ? 'value' : 'value1'">{{ centerData.sb == '正常' ? '低风险' : centerData.sb
                }}</span>
            </div>
          </div>
          <div class="item item3">
            <div class="icon-box">
              <div class="icon"></div>
            </div>
            <div class="item-monitor-box">
              <span class="title">粉尘预警监测</span>
              <span :class="centerData.fc ? 'value' : 'value1'">{{ centerData.fc == '正常' ? '低风险' : centerData.fc
                }}</span>
            </div>
          </div>
          <div class="item item4">
            <div class="icon-box">
              <div class="icon"></div>
            </div>
            <div class="item-monitor-box">
              <span class="title">瓦斯预警监测</span>
              <span :class="centerData.ws ? 'value' : 'value1'">{{ centerData.ws == '正常' ? '低风险' : centerData.ws
                }}</span>
              <div class="">
                <span class="title">矿井瓦斯鉴定等级监测</span>
                <span class="value">低瓦斯</span>
              </div>
            </div>
          </div>
          <div class="item item5">
            <div class="icon-box">
              <div class="icon"></div>
            </div>
            <div class="item-monitor-box">
              <span class="title">通风预警监测</span>
              <span :class="centerData.tf ? 'value' : 'value1'">{{ centerData.tf == '正常' ? '低风险' : centerData.tf
                }}</span>
            </div>
          </div>
        </div>
      </div>
      <div class="fire-monitor">
        <div class="monitor-title top" @click="showModal('fire')">火灾预警监测</div>
        <div class="container">
          <div class="item item1">
            <div class="icon"></div>
            <div class="data-box" v-for="(item, index) in fireMonitor1" :key="index">
              <div :class="{
                value1: item.level == 0,
                value2: item.level == 101,
                value3: item.level == 102,
                value4: item.level == 103,
                value5: item.level == 104,
                value6: item.level == 201,
                value: item.level != 0 && item.level != 101 && item.level != 102 && item.level != 103 && item.level != 104 && item.level != 201,
              }">{{ item.value ? item.value : '-' }}
              </div>
              <div class="title">{{ item.title }}</div>
            </div>
          </div>
          <div class="item">
            <div class="icon"></div>
            <div class="data-box" v-for="(item, index) in fireMonitor" :key="index">
              <!-- <div :class="{
                'value1': item.level == 0,
                'value2': item.level == 101,
                'value3': item.level == 102,
                'value4': item.level == 103,
                'value5': item.level == 104,
                'value6': item.level == 201,
                'value': item.level != 0 && item.level != 101 && item.level != 102 && item.level != 103 && item.level != 104 && item.level != 201,
              }"> {{ item.value ? item.value : '-' }} </div> -->
              <div class="value1"> {{ !item.value && item.value != '0' ? '-' : item.value == '正常' ? '低风险' : item.value
                }}
              </div>
              <div class="title">{{ item.title }}</div>
            </div>
          </div>
        </div>
        <div class="bottom"></div>
      </div>
    </div>
    <div class="lr right-box">
      <ventBox1>
        <template #title>
          <div class="monitor-title" @click="showModal('gas')">瓦斯预警监测</div>
        </template>
        <template #container>
          <div class="gas-box">
            <div class="gas-item">
              <div class="top">
                <div class="value">{{ gasData.sums }}</div>
                <div class="title">安全监测系统监测点</div>
              </div>
              <div class="detail-box">
                <div class="detail-item" v-for="(item, index) in gasMonitor" :key="index">
                  <div class="">{{ item.label }}</div>
                  <div class="value">{{ !item.value && item.value != '0' ? '-' : item.value }}</div>
                </div>
              </div>
            </div>
            <div class="gas-item">
              <div class="top">
                <div class="value">{{ gasData.sums1 != 0 ? gasData.sums1 : '-' }}</div>
                <div class="title">瓦斯抽采系统监测点</div>
              </div>
              <div class="detail-box">
                <div class="detail-item" v-for="(item, index) in gasMonitor" :key="index">
                  <div class="">{{ item.label }}</div>
                  <div class="value">{{ !item.value1 && item.value1 != '0' ? '-' : item.value1 }}</div>
                </div>
              </div>
            </div>
          </div>
        </template>
      </ventBox1>
      <ventBox1 class="vent-margin-t-10">
        <template #title>
          <div class="monitor-title" @click="showModal('dust')">粉尘预警监测</div>
        </template>
        <template #container>
          <!-- <div class="dust-monitor">
            <div v-for="(item, index) in dustMonitor" :key="index" class="item-box">
              <div class="title">{{ item.title }}</div>
              <div class="value">0个</div>
            </div>
          </div> -->

          <BarSingle :xAxisData="xAxisData" :dataSource="dustData.levels" height="332px" :chartsColumns="chartsColumns"
            :option="option" :color="colors" :fontColor="fontColor" />
        </template>
      </ventBox1>
    </div>
  </div>
</template>

<script setup lang="ts">
import { ref, onMounted, onUnmounted, reactive, } from 'vue';
import { useRouter } from 'vue-router';
import customHeader from '/@/components/vent/customHeader.vue';
import { getTotalList, sysTypeWarnList } from './alarm.api';
import { iconsMonitor, chartsColumns, xAxisData, option, colors, fontColor, fireMonitor, fireMonitor1 } from './alarm.data';
import ventBox1 from '/@/components/vent/ventBox1.vue';
import BarSingle from '../../../../components/chart/BarSingle.vue';
import { rainBg } from '/@/utils/ui.js';

let router = useRouter()

const warnNumMap = new Map([
  ['fire', 0],
  ['dust', 0],
  ['vent', 0],
  ['gas', 0],
]);

const resetScroll = (e: Event) => {
  if (e.target && e.target) (e.target as Element).scrollTop = 0;
};
let windData = reactive({
  levels: {},
  jf: 0,
  hf: 0,
  xf: 0,
}); //通风监测数据
let dustData = reactive({
  //粉尘监测数据
  levels: {},
});
let centerData = reactive({
  fire: '',
  tf: '',
  ws: '',
  sb: '',
  fc: '',
  levels: 0,
});
//瓦斯
let gasMonitor = reactive<any[]>([]);
let gasData = {
  sums: 0,
  sums1: 0,
};

//跳转详情
function showModal(data) {
  switch (data) {
    case 'vent':
      router.push('/ventilate/warn')
      break;
    case 'fire':
      router.push('/fire/warn')
      break;
    case 'dust':
      router.push('/dust/warn')
      break;
    case 'gas':
      router.push('/gas/warn')
      break;
    case 'sbyj':
      router.push('/device/warn')
      break;
  }
}


// https获取监测数据
let timer: null | NodeJS.Timeout = null;
function getMonitor(flag = false) {
    timer = setTimeout(
      async () => {
        // await getDataSource();
        await getList();
        if (timer) {
          timer = null;
        }
        getMonitor();
      },
      flag ? 0 : 10000
    );
}

// 获取预警数据
async function getList() {
  const res = await getTotalList({});
  console.log(res, '预警数据--------------');
  let data = [];
  windData.levels = res.info.sysInfo.ventS.levels;
  windData.levels['blue'] = warnNumMap.get('vent');
  // windData.jf = res.ventInfo.zongfengliang;
  windData.jf = res.ventInfo.zongjinfeng;
  windData.hf = res.ventInfo.zonghuifeng;
  windData.xf = res.ventInfo.xufengliang;
  dustData.levels = res.info.sysInfo.dustS.levels;
  dustData.levels['blue'] = warnNumMap.get('dust');
  centerData.fire = res.info.sysInfo.fireS.status;
  centerData.tf = res.info.sysInfo.ventS.status;
  centerData.ws = res.info.sysInfo.gasS.status;
  centerData.sb = res.info.deviceWarnInfo.status;
  centerData.fc = res.info.sysInfo.dustS.status;
  Object.keys(res.info.sysInfo).forEach((v) => {
    if (res.info.sysInfo[v].maxLevel) {
      data.push(res.info.sysInfo[v].maxLevel);
    } else {
      data.push(0);
    }
  });
  data = data.sort((a, b) => b - a);
  centerData.levels = data[0];
  Object.keys(iconsMonitor).forEach((el) => {
    if (res.info.devicekindInfo[el]) {
      iconsMonitor[el].level = res.info.devicekindInfo[el].maxLevel;
    }
  });
  fireMonitor[0].value =
    res.info.sysInfo.fireS.summaryInfo.external.temperature && res.info.sysInfo.fireS.summaryInfo.external.temperature.maxlevel == '0'
      ? '正常'
      : '-';
  fireMonitor[1].value =
    res.info.sysInfo.fireS.summaryInfo.external.smokeval &&
      res.info.sysInfo.fireS.summaryInfo.external.smokeval.maxlevel &&
      res.info.sysInfo.fireS.summaryInfo.external.smokeval.maxlevel == '0'
      ? '正常'
      : '-';
  fireMonitor[2].value =
    res.info.sysInfo.fireS.summaryInfo.external.fireval &&
      res.info.sysInfo.fireS.summaryInfo.external.fireval.maxlevel &&
      res.info.sysInfo.fireS.summaryInfo.external.fireval.maxlevel == '0'
      ? '正常'
      : '-';
  fireMonitor[3].value =
    res.info.sysInfo.fireS.summaryInfo.external.coval && res.info.sysInfo.fireS.summaryInfo.external.coval.value
      ? res.info.sysInfo.fireS.summaryInfo.external.coval.value
      : '-';
  // fireMonitor[0].level = res.info.sysInfo.fireS.summaryInfo.external.temperature ? res.info.sysInfo.fireS.summaryInfo.external.temperature.maxlevel : '';
  // fireMonitor[1].value = res.info.sysInfo.fireS.summaryInfo.external.coval ? res.info.sysInfo.fireS.summaryInfo.external.coval.value : '';
  // fireMonitor[1].level = res.info.sysInfo.fireS.summaryInfo.external.coval ? res.info.sysInfo.fireS.summaryInfo.external.coval.maxlevel : '';
  // fireMonitor[2].value = res.info.sysInfo.fireS.summaryInfo.external.chval ? res.info.sysInfo.fireS.summaryInfo.external.chval.value : '';
  // fireMonitor[2].level = res.info.sysInfo.fireS.summaryInfo.external.chval ? res.info.sysInfo.fireS.summaryInfo.external.chval.maxlevel : '';
  // fireMonitor[3].value = res.info.sysInfo.fireS.summaryInfo.external.ch2val ? res.info.sysInfo.fireS.summaryInfo.external.ch2val.value : '';
  // fireMonitor[3].level = res.info.sysInfo.fireS.summaryInfo.external.ch2val ? res.info.sysInfo.fireS.summaryInfo.external.ch2val.maxlevel : '';
  // fireMonitor[4].value = res.info.sysInfo.fireS.summaryInfo.external.co2val ? res.info.sysInfo.fireS.summaryInfo.external.co2val.value : '';
  // fireMonitor[4].level = res.info.sysInfo.fireS.summaryInfo.external.co2val ? res.info.sysInfo.fireS.summaryInfo.external.co2val.maxlevel : '';
  // fireMonitor[5].value = res.info.sysInfo.fireS.summaryInfo.external.o2val ? res.info.sysInfo.fireS.summaryInfo.external.o2val.value : '';
  // fireMonitor[5].level = res.info.sysInfo.fireS.summaryInfo.external.o2val ? res.info.sysInfo.fireS.summaryInfo.external.o2val.maxlevel : '';

  fireMonitor1[0].value = res.info.sysInfo.fireS.summaryInfo.internal.coval ? res.info.sysInfo.fireS.summaryInfo.internal.coval.value : '';
  fireMonitor1[0].level = res.info.sysInfo.fireS.summaryInfo.internal.coval ? res.info.sysInfo.fireS.summaryInfo.internal.coval.maxlevel : '';
  fireMonitor1[1].value = res.info.sysInfo.fireS.summaryInfo.internal.chval ? res.info.sysInfo.fireS.summaryInfo.internal.chval.value : '';
  fireMonitor1[1].level = res.info.sysInfo.fireS.summaryInfo.internal.chval ? res.info.sysInfo.fireS.summaryInfo.internal.chval.maxlevel : '';
  fireMonitor1[2].value = res.info.sysInfo.fireS.summaryInfo.internal.ch2val ? res.info.sysInfo.fireS.summaryInfo.internal.ch2val.value : '';
  fireMonitor1[2].level = res.info.sysInfo.fireS.summaryInfo.internal.ch2val ? res.info.sysInfo.fireS.summaryInfo.internal.ch2val.maxlevel : '';
  fireMonitor1[3].value = res.info.sysInfo.fireS.summaryInfo.internal.co2val ? res.info.sysInfo.fireS.summaryInfo.internal.co2val.value : '';
  fireMonitor1[3].level = res.info.sysInfo.fireS.summaryInfo.internal.co2val ? res.info.sysInfo.fireS.summaryInfo.internal.co2val.maxlevel : '';
  fireMonitor1[4].value = res.info.sysInfo.fireS.summaryInfo.internal.o2val ? res.info.sysInfo.fireS.summaryInfo.internal.o2val.value : '';
  fireMonitor1[4].level = res.info.sysInfo.fireS.summaryInfo.internal.o2val ? res.info.sysInfo.fireS.summaryInfo.internal.o2val.maxlevel : '';
  gasMonitor.length = 0;
  gasData.sums = 0;
  gasData.sums1 = 0;
  res.info.sysInfo.gasS.devices.forEach((el) => {
    gasData.sums += el.gasNumber;
    gasData.sums1 += el.pumpNumber;
    gasMonitor.push({ label: el.systemname, value: el.gasNumber, value1: el.pumpNumber });
  });
}

function getLevelNum() {
  return new Promise(async (resolve) => {
    const typeArr = ['fire', 'dust', 'vent', 'gas'];
    for (let i = 0; i < typeArr.length; i++) {
      const type = typeArr[i];
      const result = await sysTypeWarnList({ type });
      warnNumMap.set(type, result['length']);
    }
    resolve(null);
  });
}

onMounted(async () => {
  await getLevelNum();
  await getMonitor(true);
  rainBg('rain', 'animation-box');
});

onUnmounted(() => {
  if (timer) {
    clearTimeout(timer);
    timer = undefined;
  }
});
</script>
<style lang="less" scoped>
@import '/@/design/vent/color.less';
@a: 370px; // 椭圆x轴半径(长半径)
@b: 107px; // 椭圆y轴半径(短半径)
@s: 40; // 坐标点的数目(数目越大，动画越精细)

@bg: #e6e2df;

.loop(@index) when (@index < @s + 1) {
  .loop((@index + 1));
  @keyframeSel: @index * 100% ./ @s;

  @{keyframeSel} {
    transform: translate(@a * (cos(360deg ./ @s * @index)), @b * (sin(360deg ./ @s * @index)));
  }
}

.sensor-container {
  width: 100%;
  height: calc(100% - 86px);
  display: flex;
  position: relative;
  top: 78px;

  .lr {
    width: 650px;
    height: 100%;

    // background-color: #ffffff10;
  }

  .left-box {
    .vent-param {
      width: 100%;
      margin-top: 10px;

      .light-group {
        display: flex;
        flex-direction: row;
        justify-content: space-between;
        position: relative;

        .param-item {
          width: 150px;
          display: flex;
          flex-direction: column;
          justify-content: center;
          align-items: center;
          position: reactive;

          .icon {
            display: block;
            position: absolute;
            top: -5px;
          }

          .param {
            display: flex;
            flex-direction: column;
            justify-content: center;
            align-items: center;

            .param-icon {
              width: 121px;
              height: 69px;
              background: url('/@/assets/images/vent/vent-param-bg.png');
              display: flex;
              flex-direction: column;
              justify-content: center;
              align-items: center;
              position: relative;
              top: -20px;
              margin-top: 10px;

              .param-title {
                position: relative;
                top: -4px;
              }

              .param-unit {
                position: relative;
                top: -2px;
                font-size: 12px;
              }
            }

            .param-val-box {
              display: flex;
              flex-direction: column;
              justify-content: center;
              align-items: center;
              position: relative;
              top: -20px;

              .param-val-icon {
                width: 2px;
                height: 15px;
                background: #00d8ff;
                position: relative;

                &::after {
                  content: '';
                  display: block;
                  position: absolute;
                  width: 6px;
                  height: 6px;
                  border-radius: 3px;
                  background: #00d8ff;
                  bottom: -2px;
                  left: -2px;
                }
              }

              .param-val {
                position: relative;
                font-family: 'douyuFont';
                // color: #20dbfd;
                text-shadow: 0 0 25px #00d8ff;
                font-size: 13px;
                border: 1px solid #40b7f3;
                padding: 5px 30px 2px 30px;
                top: 2px;

                &::after {
                  width: calc(100% - 4px);
                  height: calc(100% - 4px);
                  content: '';
                  position: absolute;
                  top: 2px;
                  left: 2px;
                  display: block;
                  border: 1px solid #006ea6;
                }
              }
            }
          }
        }
      }
    }

    .icons-box {
      display: flex;
      flex-wrap: wrap;
      // max-height: 365px;
      height: 365px;
      overflow-y: hidden;

      // align-items: start ;
      &:hover {
        overflow-y: auto;
        overflow-x: auto;

        // &>.icon-item {
        //   animation-play-state: paused;
        //   animation: move1 2s linear;
        // }
      }

      .icon-item {
        position: relative;
        display: flex;
        align-items: center;
        justify-content: center;
        padding: 3px;
        // animation: move 10s linear infinite;

        &:nth-child(even) {
          padding-right: 0px;
        }

        .level-text {
          position: absolute;
          top: 51px;
          right: 25px;
          color: #fff;
          font-family: 'douyuFont';
          font-size: 12px;
        }

        .level-text-0 {
          color: rgb(145, 230, 9);
          text-shadow: 2px 2px 4px #001c22;
        }

        .level-text-1 {
          color: rgb(0, 242, 255);
          text-shadow: 2px 2px 4px #001c22;
        }

        .level-text-2 {
          color: #ffff35;
          text-shadow: 2px 2px 4px #313100;
        }

        .level-text-3 {
          color: #ffbe69;
          text-shadow: 2px 2px 4px #271600;
        }

        .level-text-4 {
          color: #ff6f00;
          // color: #09caff;
          text-shadow: 2px 2px 4px #060200;
        }

        .level-text-5 {
          color: #ff0000;
          text-shadow: 2px 2px 4px #200000;
        }

        .level-text-6 {
          color: #bbb;
          text-shadow: 2px 2px 4px #001c22;
        }

        img {
          width: 225px;
          height: 79px;
        }
      }

      .wrapper {
        position: absolute;
        top: 48px;
        left: 82px;
        color: #ffffffe0;
        font-size: 13px;
        text-align: center;
        letter-spacing: 1px;
      }
    }

    @keyframes move {
      0% {
        transform: translateY(0px);
      }

      100% {
        transform: translateY(-269px);
      }
    }

    @keyframes move1 {
      0% {
        transform: translateY(0px);
      }
    }
  }

  .center-box {
    width: calc(100% - 710px);
    // background-color: #ffffff10;
    margin: 0 8px;
    display: flex;
    flex-direction: column;
    justify-content: flex-end;

    .fire-monitor {
      display: flex;
      flex-direction: column;
      width: 100%;
      position: relative;

      .top {
        width: 100%;
        height: 35px;
        background: url('/@/assets/images/vent/box-top-bg.png');
        background-size: 100% 100%;
        text-align: center;
        color: #fff;
        padding-top: 6px;
      }

      .container {
        width: calc(100% - 2px);
        min-height: 50px;
        padding: 0 10px;
        color: #fff;
        background-color: #00213236;
        backdrop-filter: blur(5px);

        &::before {
          content: '';
          display: block;
          position: absolute;
          top: 5px;
          left: 0;
          width: 1px;
          height: calc(100% - 10px);
          background-image: linear-gradient(#3df6ff00, #3df6ff, #3df6ff00);
        }

        &::after {
          content: '';
          display: block;
          position: absolute;
          right: 0;
          top: 5px;
          width: 1px;
          height: calc(100% - 10px);
          background: linear-gradient(#3df6ff00, #3df6ff, #3df6ff00);
        }

        .item {
          height: 130px;
          width: 100%;
          position: relative;
          top: -10px;
          display: flex;
          // justify-content: space-between;
          align-content: center;
          padding-top: 50px;

          &::before {
            content: '';
            width: 100%;
            height: 150px;
            position: absolute;
            top: 0px;
            background: url('/@/assets/images/vent/fire-bg-top.png');
            background-size: 100% 100%;
          }

          .icon {
            width: 82px;
            height: 36px;
            margin: 0 20px 0 50px;
            background: url('/@/assets/images/vent/icon-bottom-bg.png');
            position: relative;
            top: 30px;

            &::after {
              position: absolute;
              content: '';
              width: 50px;
              height: 50px;
              top: -25px;
              left: 20px;
              background: url('/@/assets/images/vent/outer-icon.svg') no-repeat;
            }
          }

          .data-box {
            display: flex;
            flex-direction: column;
            // margin: 0 10px;
            width: 118px;

            .value {
              font-size: 16px;
              font-family: 'douyuFont';
              color: #2bdcff;
              margin-bottom: 5px;
            }

            .value1 {
              font-size: 16px;
              font-family: 'douyuFont';
              margin-bottom: 5px;
              color: rgb(145, 230, 9);
            }

            .value2 {
              font-size: 16px;
              font-family: 'douyuFont';
              margin-bottom: 5px;
              color: rgb(0, 242, 255);
            }

            .value3 {
              font-size: 16px;
              font-family: 'douyuFont';
              margin-bottom: 5px;
              color: #ffff35;
            }

            .value4 {
              font-size: 16px;
              font-family: 'douyuFont';
              margin-bottom: 5px;
              color: #ffbe69;
            }

            .value5 {
              font-size: 16px;
              font-family: 'douyuFont';
              margin-bottom: 5px;
              color: #ff6f00;
            }

            .value6 {
              font-size: 16px;
              font-family: 'douyuFont';
              margin-bottom: 5px;
              color: #ff0000;
            }

            .title {
              font-size: 13px;
            }
          }
        }

        .item1 {
          top: -10px;

          &::before {
            transform: matrix(1, 0, 0, -1, 0, 0);
          }

          .icon {
            &::after {
              background: url('/@/assets/images/vent/inner-icon.svg') no-repeat;
            }
          }
        }
      }

      .bottom {
        width: 100%;
        height: 35px;
        background: url('/@/assets/images/vent/box-bottom-bg.png');
        background-size: 100% 100%;
        position: absolute;
        bottom: 0;
      }
    }

    .animation-box {
      height: fit-content;
      flex: 1;
      margin-bottom: 10px;
      background: url('/@/assets/images/vent/alarm/center-bg.png');
      background-size: contain;
      background-position: center;
      display: flex;
      flex-direction: column;
      align-items: center;
      position: relative;
      top: 45px;

      .rain {
        position: absolute;
      }

      .bottom {
        width: 528px;
        height: 395px;
        background-repeat: no-repeat;
        position: absolute;
        z-index: 999;

        &::before {
          content: '';
          width: 325px;
          height: 379px;
          position: absolute;
          left: 105px;
          top: -60px;
          background: url('/@/assets/images/vent/alarm/warning-bg.png') no-repeat;
        }

        .animation1 {
          width: 390px;
          height: 78px;
          position: absolute;
          top: -30px;
          left: 80px;
          z-index: 999;

          // animation: rotate3 3s linear infinite;
          .ball {
            position: absolute;
            width: 12px;
            height: 12px;
            background: radial-gradient(closest-side, #e1f7f8, #e1f7f800);
            border-radius: 6px;
            background-size: cover;
            offset-path: path('M186.917-.75c12.711,0,25.415.263,37.757.783,12.03.506,23.863,1.262,35.171,2.245,11.1.966,21.816,2.161,31.835,3.553,9.928,1.379,19.265,2.963,27.751,4.709s16.2,3.668,22.92,5.713A120.653,120.653,0,0,1,359.7,22.825a40.842,40.842,0,0,1,11.018,7.3c2.568,2.581,3.87,5.239,3.87,7.9s-1.3,5.322-3.87,7.9a40.842,40.842,0,0,1-11.018,7.3,120.653,120.653,0,0,1-17.345,6.572c-6.716,2.044-14.428,3.966-22.92,5.713s-17.823,3.329-27.751,4.709c-10.02,1.392-20.731,2.588-31.835,3.553-11.308.984-23.142,1.739-35.171,2.245-12.343.519-25.046.783-37.757.783s-25.415-.263-37.757-.783c-12.03-.506-23.863-1.262-35.171-2.245-11.1-.966-21.816-2.161-31.835-3.553-9.928-1.379-19.265-2.963-27.751-4.709s-16.2-3.668-22.92-5.713a120.652,120.652,0,0,1-17.345-6.572,40.841,40.841,0,0,1-11.018-7.3c-2.568-2.581-3.87-5.239-3.87-7.9s1.3-5.322,3.87-7.9a40.842,40.842,0,0,1,11.018-7.3,120.651,120.651,0,0,1,17.345-6.572C38.2,14.208,45.91,12.286,54.4,10.54S72.225,7.211,82.153,5.831c10.02-1.392,20.731-2.588,31.835-3.553C125.3,1.294,137.13.539,149.16.033,161.5-.487,174.206-.75,186.917-.75Zm0,76.98c49.941,0,96.885-4,132.186-11.257,17.134-3.523,30.578-7.623,39.96-12.184,9.642-4.688,14.53-9.653,14.53-14.759s-4.889-10.072-14.53-14.759c-9.382-4.561-22.826-8.66-39.96-12.184C283.8,3.827,236.858-.171,186.917-.171s-96.885,4-132.186,11.257C37.6,14.61,24.153,18.709,14.771,23.27,5.129,27.958.241,32.923.241,38.029S5.129,48.1,14.771,52.789c9.382,4.561,22.826,8.661,39.96,12.184C90.032,72.232,136.976,76.23,186.917,76.23Z'
              );
            animation: 10s linear 0s infinite alternate ball;
          }
        }

        .animation2 {
          width: 430px;
          height: 92px;
          position: absolute;
          top: 0px;
          left: 60px;
          z-index: 999;

          // animation: rotate4 3s linear infinite;
          .ball1 {
            position: absolute;
            width: 12px;
            height: 12px;
            background: radial-gradient(closest-side, #e1f7f8, #e1f7f800);
            border-radius: 6px;
            background-size: cover;
            offset-path: path('M206.689-.75c14.05,0,28.092.311,41.735.925,13.3.6,26.377,1.492,38.877,2.655,12.275,1.142,24.114,2.555,35.189,4.2,10.974,1.631,21.294,3.5,30.674,5.567s17.91,4.337,25.335,6.754a128.134,128.134,0,0,1,19.172,7.771,45.082,45.082,0,0,1,12.178,8.633c2.838,3.051,4.278,6.195,4.278,9.344s-1.439,6.293-4.278,9.344a45.082,45.082,0,0,1-12.178,8.633A128.134,128.134,0,0,1,378.5,70.847c-7.424,2.417-15.948,4.69-25.335,6.754s-19.7,3.936-30.674,5.567c-11.075,1.646-22.915,3.059-35.189,4.2-12.5,1.163-25.58,2.056-38.877,2.655-13.643.614-27.685.925-41.735.925s-28.092-.311-41.735-.925c-13.3-.6-26.377-1.492-38.877-2.655-12.275-1.142-24.114-2.555-35.189-4.2-10.974-1.631-21.294-3.5-30.674-5.567S42.3,73.265,34.879,70.847a128.133,128.133,0,0,1-19.173-7.771A45.082,45.082,0,0,1,3.528,54.444C.689,51.393-.75,48.249-.75,45.1s1.439-6.293,4.278-9.344a45.083,45.083,0,0,1,12.178-8.633,128.133,128.133,0,0,1,19.173-7.771c7.424-2.417,15.948-4.69,25.335-6.754s19.7-3.936,30.674-5.567c11.075-1.646,22.915-3.059,35.189-4.2,12.5-1.163,25.58-2.056,38.877-2.655C178.6-.439,192.639-.75,206.689-.75Zm0,91.015c55.2,0,107.093-4.727,146.113-13.31,18.939-4.166,33.8-9.012,44.17-14.405,10.657-5.542,16.061-11.413,16.061-17.45s-5.4-11.908-16.061-17.45c-10.37-5.393-25.231-10.24-44.17-14.405C313.782,4.662,261.892-.065,206.689-.065S99.6,4.662,60.576,13.244c-18.939,4.166-33.8,9.012-44.17,14.405C5.749,33.192.345,39.063.345,45.1s5.4,11.908,16.061,17.45c10.37,5.393,25.231,10.24,44.17,14.405C99.6,85.538,151.487,90.265,206.689,90.265Z'
              );
            animation: 10s linear 0s infinite alternate ball1;
          }
        }

        .text-box {
          width: 100%;
          display: flex;
          flex-direction: column;
          color: #fff;
          align-items: center;
          margin-top: 90px;

          .text1 {
            font-size: 26px;
            font-weight: 600;
            letter-spacing: 2px;
            margin-bottom: 10px;
          }

          .text2 {
            font-size: 18px;
            color: #ffffffdd;
          }
        }

        .icon-animation {
          width: 178px;
          height: 208px;
          margin: 0 auto;
          top: -130px;
          left: 4px;
          position: relative;
          animation: 0.5s linear 0s infinite alternate iconMove;
        }
      }

      .bottom1 {
        background-image: url('/@/assets/images/vent/alarm/warning-icon-bg1.png');

        .icon-animation {
          background: url('/@/assets/images/vent/alarm/warning-icon-bg-a1.png');
        }

        .text-box {
          .text1 {
            color: #00d8ff;
          }
        }
      }

      .bottom2 {
        background-image: url('/@/assets/images/vent/alarm/warning-icon-bg2.png');

        .icon-animation {
          background: url('/@/assets/images/vent/alarm/warning-icon-bg-a2.png');
        }

        .text-box {
          .text1 {
            color: #fcfc22;
          }
        }
      }

      .bottom3 {
        background-image: url('/@/assets/images/vent/alarm/warning-icon-bg3.png');

        .icon-animation {
          background: url('/@/assets/images/vent/alarm/warning-icon-bg-a3.png');
        }

        .text-box {
          .text1 {
            color: #ff7010;
          }
        }
      }

      .bottom4 {
        background-image: url('/@/assets/images/vent/alarm/warning-icon-bg4.png');

        .icon-animation {
          background: url('/@/assets/images/vent/alarm/warning-icon-bg-a4.png');
        }

        .text-box {
          .text1 {
            color: #df4e43;
          }
        }
      }

      .bottom5 {
        background-image: url('/@/assets/images/vent/alarm/warning-icon-bg5.png');

        .icon-animation {
          background: url('/@/assets/images/vent/alarm/warning-icon-bg-a5.png');
        }

        .text-box {
          .text1 {
            color: #ff2313;
            // animation: color-blink 1s infinite;
          }

          // @keyframes color-blink {
          //   0% { color: red; }
          //   50% { color: blue; }
          //   100% { color: red; }
          // }
        }
      }

      .total-item-monitor-box {
        width: 100%;
        height: 237px;
        position: relative;
        top: 180px;
        left: 265px;
        background: url('/@/assets/images/vent/alarm/bottom1.png') no-repeat;
        background-size: contain;

        &::after {
          content: '';
          width: 750px;
          height: 750px;
          position: absolute;
          transform-style: preserve-3d;
          transform: translateX(0%) translateY(0%) rotateX(72deg);
          background: url('/@/assets/images/vent/alarm/bottom.png');
          animation: rotate1 3s linear infinite;
          top: -200px;
          left: -180px;
        }

        .item {
          position: absolute;

          // width: 107px;
          // height: 107px;
          // left: 120px;
          // top: 115px;
          // animation: red-ball 10s linear infinite;
          .icon-box {
            width: 100px;
            height: 100px;

            position: relative;
            z-index: 0;

            &::before {
              position: absolute;
              content: '';
              width: 105px;
              height: 68px;
              top: 15px;
              z-index: -1;
              background: url('/@/assets/images/vent/alarm/icon-bg.png') no-repeat;
            }

            &::after {
              position: absolute;
              content: '';
              width: 71px;
              height: 71px;
              top: 26px;
              left: 14px;
              z-index: 1;
              background: url(/src/assets/images/vent/alarm/icon-animation.png) no-repeat;
              transform: translateX(0%) rotateX(70deg);
              animation: rotate2 2s linear infinite;
            }

            .icon {
              width: 100px;
              height: 100px;
              background-repeat: no-repeat;
              background-position: top center;
              position: relative;
              top: 5px;
            }
          }

          .item-monitor-box {
            color: #fff;
            position: relative;
            top: -135px;
            left: -20px;
            font-weight: 600;
            // background: #06020066;
            padding: 5px 20px 8px 20px;

            &::before {
              position: absolute;
              content: '';
              width: 196px;
              height: 48px;
              left: -20px;
              top: -10px;
              background: url('/@/assets/images/vent/alarm/data-bg.png');
            }

            .value {
              color: #2bdcff;
              margin-left: 20px;
            }

            .value1 {
              font-size: 16px;
              font-weight: 800;
              margin-top: 6px;
              margin-left: 10px;
              color: #ff0000;
              animation: color-blink 1s infinite;
            }

            @keyframes color-blink {
              0% {
                color: red;
              }

              50% {
                color: rgb(198, 0, 0);
              }

              100% {
                color: rgb(255, 18, 18);
              }
            }
          }
        }

        .item1 {
          top: 230px;
          left: 150px;

          .icon {
            background-image: url('/@/assets/images/vent/alarm/icon-fire.svg');
          }
        }

        .item2 {
          top: 185px;
          left: -120px;

          .icon {
            background-image: url('/@/assets/images/vent/alarm/icon-device.svg');
          }
        }

        .item3 {
          top: 185px;
          left: 420px;

          .icon {
            background-image: url('/@/assets/images/vent/alarm/icon-dust.svg');
          }
        }

        .item4 {
          top: 20px;
          left: 390px;

          .icon {
            background-image: url('/@/assets/images/vent/alarm/icon-gas.svg');
          }

          .item-monitor-box {
            top: -155px;

            &::before {
              top: 10px;
            }
          }
        }

        .item5 {
          top: 25px;
          left: -110px;

          .icon {
            background-image: url('/@/assets/images/vent/alarm/icon-vent.svg');
          }
        }
      }

      @keyframes iconMove {
        100% {
          opacity: 0;
        }
      }

      @keyframes rotate1 {
        0% {
          transform: translateX(0%) rotateX(72deg) rotateZ(-360deg);
        }

        100% {
          transform: translateX(0%) rotateX(72deg) rotateZ(0);
        }
      }

      @keyframes rotate2 {
        0% {
          transform: translateX(0%) rotateX(70deg) rotateZ(0);
        }

        100% {
          transform: translateX(0%) rotateX(70deg) rotateZ(-360deg);
        }
      }

      @keyframes rotate3 {
        0% {
          transform: translateX(0%) rotateX(80deg) rotateZ(0);
        }

        100% {
          transform: translateX(0%) rotateX(80deg) rotateZ(-360deg);
        }
      }

      @keyframes rotate4 {
        100% {
          transform: translateX(0%) rotateX(80deg) rotateZ(0);
        }

        0% {
          transform: translateX(0%) rotateX(80deg) rotateZ(-360deg);
        }
      }

      @keyframes ball {
        100% {
          offset-distance: 100%;
        }

        0% {
          offset-distance: 0%;
        }
      }

      @keyframes ball1 {
        0% {
          offset-distance: 100%;
        }

        100% {
          offset-distance: 0%;
        }
      }
    }
  }

  .right-box {
    .dust-monitor {
      display: flex;
      justify-content: space-between;
      padding: 0 20px;
      margin-bottom: 20px;
      margin-top: 15px;

      .value {
        width: 131px;
        height: 44px;
        background: url('/@/assets/images/vent/value-bg.png');
        display: flex;
        justify-content: center;
        align-items: center;
      }

      .title {
        text-align: center;
        margin-bottom: 5px;
      }

      .value {
        font-size: 16px;
        font-family: 'douyuFont';
        color: #3df5ff;
      }
    }

    .gas-box {
      height: 390px;
      display: flex;
      justify-content: space-between;
      padding: 0 10px;

      .gas-item {
        position: relative;

        .top {
          height: 136px;
          padding-top: 30px;

          .value {
            font-size: 26px;
            font-family: 'douyuFont';
            color: #3df5ff;
            text-align: center;
            margin-bottom: 5px;
          }

          .title {
            width: 205px;
            height: 48px;
            text-align: center;
            background: url('/@/assets/images/vent/plane.png') no-repeat;
            background-size: contain;
            background-position: bottom;
          }

          &::before {
            position: absolute;
            content: '';
            width: 136px;
            height: 101px;
            left: 35px;
            top: 15px;
            background: url('/@/assets/images/vent/small-bg1.png') no-repeat;
            background-size: cover;
          }
        }

        .detail-box {
          position: relative;
          margin: 0 auto;
          width: 184px;
          height: calc(100% - 136px);
          background: linear-gradient(to bottom, transparent, #00679b77) no-repeat;
          background-size: cover;
          display: flex;
          flex-direction: column;
          justify-content: flex-start;
          align-items: center;
          overflow-y: auto;
          // padding: 50px 0 20px 0;

          &::after {
            position: absolute;
            content: '';
            left: 0px;
            bottom: 0px;
            width: 184px;
            height: 31px;
            background: url('/@/assets/images/vent/plane1.png') no-repeat center;
            background-size: 100% 100%;
            background-position: bottom;
          }

          .detail-item {
            width: 100%;
            height: 40px;
            background-image: linear-gradient(to right, #39a3ff66, #39a3ff00);
            // margin: 5px 0;
            display: flex;
            padding: 0 10px;
            justify-content: space-between;
            align-items: center;
            margin-bottom: 30px;

            .value {
              font-size: 16px;
              font-family: 'douyuFont';
              color: #2bdcff;
              text-align: center;
            }
          }
        }
      }
    }
  }

  .monitor-title {
    cursor: pointer;
  }
}
</style>
