<template>
  <div class="fireZhuj">
    <iframe src="http://172.16.253.25:8090/FireZhuj/monitor" width="100%" height="100%" frameborder="0"></iframe>
  </div>
</template>

<script setup lang="ts">
import { ref, reactive, onMounted } from 'vue'

</script>

<style lang="less" scoped>
.fireZhuj {
  position: relative;
  width: calc(100% - 20px);
  // height: calc(100vh - 82px);
  height: 863px;
  margin: 50px 10px 15px;
  background: #282828;
}
</style>